<template>
	<view>
		<view class="">
			<view class="radius_box" style="padding: 0;margin: 30rpx;">
				<view class="" v-for="(v,i) in arr" :key="i">
					<body_info_components :key_name="v" :value="parseFloat(dataInfo.data_msg[v])"></body_info_components>
				</view>
			</view>
		</view>
	</view>
</template>

<script>
	export default {
		data() {
			return {
				dataInfo:{},
				arr:[
					'BMI',
					'bodyFatPercentage',
					'leanBodyMass',
					'muscleRate',
					'muscleMass',
					'subcutaneousFat',
					'bodyMoisture',
					'skeletalMuscleRate',
					'boneMass',
					'proteinAmount',
					'basalMetabolicRate',
				]
			}
		},
		onLoad() {
			const dataKey = 'bodyData'; // 同上面设置的key
			let get = uni.getStorageSync(dataKey)
			
			if(!get){
				uni.showToast({
					title:"读取数据失败"
				})
				setTimeout(() => {
					uni.navigateBack({
						delta:-1
					})
				},2000)
				return
			}
			const data = JSON.parse(get);
			this.dataInfo = data;
			uni.removeStorageSync(dataKey);
		},
		methods: {
			
		}
	}
</script>

<style>

</style>
